
LOAD /vvi/te/suite/ldmeter.sql;

-- ld_dir ('/data6/284826', '%.gz', 'http://bsbm.org');
ld_dir ('/data7/569652', '%.gz', 'http://bsbm.org');
-- ld_dir ('/data8/2848260', '%.gz', 'http://bsbm.org');

-- Record CPU time 
SELECT getrusage ()[0] + getrusage ()[1];


rdf_loader_run () &
rdf_loader_run () &
rdf_loader_run () &
rdf_loader_run () &
rdf_loader_run () &
rdf_loader_run () &
rdf_loader_run () &
rdf_loader_run () &


wait_for_children;
checkpoint;

-- Record CPU time
select getrusage ()[0] + getrusage ()[1];


sparql select count (*) from <http://bsbm.org> { ?s ?p ?o};

